Ventilation

110 Regulating construction of buildings intended as places for public meetings. No person to begin to build until plan has been approved by commissioners.
Before beginning to build any building intended to be used as a church, chapel, or school, or a place of public amusement or entertainment, or for holding large numbers of people for any purpose whatsoever, within the limits of the special Act, the person intending to build the same shall give fourteen days notice in writing to the commissioners, and shall accompany such notice with a plan and description of the manner proposed for its construction, with respect to the means of supplying fresh air to such building; and no person shall begin to build such building until the manner proposed for its construction, with respect to the means for supplying fresh air, have been approved of by the commissioners; and in default of sending such notice, or if any such building be erected without such approval, the commissioners may cause such building, or such part of it as they consider necessary, to be pulled down or altered, at the expence of the owner, and any expence incurred by the commissioners in so doing may be recovered as herein-before provided with respect to ruinous or dangerous buildings taken down or repaired by the commissioners.