General Functions of Minister of Supply

1 General duty of Minister of Supply.
It shall be the general duty of the Minister of Supply (in this Act referred to as “the Minister”) to promote and control the development of atomic energy.
S. 1. amended by Atomic Energy Authority Act 1954 (c. 32), s. 3(1)