7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
S. 7 repealed by Post Office Savings Bank Act 1954 (c. 62), Sch., and Trustee Savings Banks Act 1954 (c. 63), Sch. 3