Miscellaneous and General

13 Provision as to persons called out or under training.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (21.7.2008) by Statute Law (Repeals) Act 2008 (c. 12), Sch. 1 Pt. 6