SCHEDULES

SCHEDULE 3 Domestic Gas and Electricity (Tariff Cap) Act 2018

3 Amendments to 2018 Act
(1) Section 5 (publication and effect of modifications) is amended as follows.
(2) In subsection (4), for “56 days” substitute “25 working days”.
(3) After subsection (4) insert—

“(5) In subsection (4), “working day” means a day other than—
(a) Saturday or Sunday,
(b) Christmas Day or Good Friday, or
(c) a day which is a bank holiday under the Banking and Financial Dealings Act 1971 in any part of the United Kingdom.”

Sch. 3 para. 3 in force at Royal Assent, see s. 30(6)