5 Modification of report and further reports.
(1) An energy conservation authority may, and if so directed by the Secretary of State shall—
(a) modify the report prepared under section 2; or
(b) prepare further reports setting out additional or modified energy conservation measures.
(2) The provisions of subsections (2) to (6) of section 2, subsections (2) to (4) of section 3, section 4 and subsection (1) of this section apply in relation to any such modified or further report.
S. 5 wholly in force at 1.4.1997: s. 5 not in force at Royal Assent, see s. 9(2); s. 5 in force (E.) (1.4.1996) by S.I. 1995/3340, arts. 2, 3; and (N.I.) (1.4.1996) by S.R. 1995/455, art. 2; and (S.) (1.12.1996) by S.I. 1996/2797, art. 2; and (W.) (1.4.1997) by S.I. 1996/3181, art 2.
S. 5 restricted (E.W.) (1.2.2005) by Local Authorities' Plans and Strategies (Disapplication) (England) Order 2005 (S.I. 2005/157), arts. 1, 4(1)