SCHEDULES

SCHEDULE 1 Optical Appliances

PART I Amendments of National Health Service Act 1977
1 In section 39 of the National Health Service Act 1977 (regulations as to arrangements for general ophthalmic services)—
(a) in paragraph (a), for the words " ophthalmic opticians and dispensing" there shall be substituted the words " and ophthalmic ";
(b) in paragraph (b), for the words " ophthalmic optician or dispensing " there shall be substituted the words " or ophthalmic "; and
(c) in paragraph (d), for the words " ophthalmic opticians or dispensing " there shall be substituted the words " or ophthalmic ".
1977 c. 49.