SCHEDULES

SCHEDULE 1 Adaptation and Minor and Consequential Amendments of Principal Act
Section 14(1).

1
In sections 18, 19(3), 20(4), 22, 26, 27(5), 28, 29 and 31 references to the principal Act, other than references to a specified provision of that Act, shall be construed as including references to this Act.

2
In section 7(2)(a) for the words “grit and dust" there shall be substituted the words “grit, dust and fumes".
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

3
In section 8(1) the reference to sections 6 and 7 of the principal Act shall be construed as including references to sections 2 to 5 of this Act.

4
In section 9 for the reference to sections 5 to 8 of the principal Act there shall be substituted a reference to sections 6 to 8 of that Act and sections 2 to 4 of this Act, and the reference to section 6(2) of that Act shall be construed as including a reference to section 3(4) of this Act.

5
In section 16(1), after paragraph (b) there shall be substituted the following words

“or
(c) dark smoke emitted otherwise than as aforesaid from industrial or trade premises within the meaning of section 1 of the Clean Air Act 1968.”

The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

6
In section 21 for the words “the provisions of this Act" there shall be substituted the words “the under-mentioned provisions of this Act or the Clean Air Act 1968", and for paragraphs (a) to (c) there shall be substituted the follwing paragraphs:—

“(a) any chimney from the operation of sections 1, 11, 16 and 19 of this Act and section 2 of the Clean Air Act 1968;
(b) any furnace, boiler or industrial plant from the operation of section 3(1) of this Act;
(c) any premises from the operation of section 1 of the said Act of 1968;
(d) any furnace from the operation of sections 6 and 7 of this Act and section 3 of that Act;
(e) the acquisition or sale of any fuel specified in the notice from the operation of section 9 of that Act.”

The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

7
In section 27(5), for the words “ten pounds" there shall be substituted the words “fifty pounds".
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

8
In section 29(2), at the end there shall be added the words “and may institute proceedings for an offence under section 1 of the Clean Air Act 1968 in the case of any smoke which affects any part of their district notwithstanding that the smoke is emitted from premises outside their district".
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

9
In section 30 references to section 1 of the principal Act shall be construed as including a reference to section 1 of this Act.

10
In section 34(1), in the definition of “chimney" for the words from “smoke" to “emitted" there shall be substituted the words “smoke, grit, dust or fumes may be emitted and, in particular, includes flues", and after the definition of “fireplace" there shall be inserted the following definition, that is to say “'fumes’ means any airborne solid matter smaller than dust".
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

11
In section 34(2) the reference to section 1 of the principal Act shall be construed as including a reference to section 1 of this Act.

12
In section 34(7) the reference to sections 6 to 8 of the principal Act shall be construed as including a reference to sections 2 to 6 of this Act.

SCHEDULE 2 PROVISIONS OF PRINCIPAL ACT REPEALED
Section 14(2).
Section 2.
Section 5.
In section 6, in subsection (1), the words from “and no oven" to “heat"; in subsections (1) and (2), the words “or oven" wherever occurring ; and, in subsections (1) and (4) the words “or land", wherever occurring.
In section 7, in subsection (1), the words from “or if an oven" to “heat"; in subsections (1), (2) and (3), the words “or oven" wherever occurring ; and in subsections (1) and (2), the words “or land", wherever occurring.
In section 8(1), the words “or land", wherever occurring, and the words “or ovens", “or on the land" and “or subjected to any process in those ovens".
Section 10 as respects any chimney seving a furnace.
In section 14(1)(c), the words “flue or".
Section 17(1), (2), (5) and (6).
In section 20(1), the words “and two".
Insection 34(1) the definition of “oven".
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.

Act repealed (27.8.1993) by 1993 c. 11, ss. 67(3), 68(2), Sch.6