Fireworks Act 1964 (repealed)
1964 c.23
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (4.7.2010) by The Pyrotechnic Articles (Safety) Regulations 2010 (S.I. 2010/1554), regs. 1(1), 49(3) (with reg. 49(13))