SCHEDULE 24 Amendment of the Pressure Equipment (Safety) Regulations 2016

4 Amendment to regulation 8
In regulation 8 (requirement for pressure equipment and assemblies to comply with sound engineering practice)—
(a) in paragraph (2)(a) for “the sound engineering practice of a Member State” substitute “sound engineering practice”; and
(b) for paragraph (3) substitute—

“3 Pressure equipment and assemblies to which this regulation applies must not bear the UK marking referred to in regulation 49 unless required to do so by other applicable UK legislation.”

.