SCHEDULE 2 Revocations

PART 1 Regulations
192 Commission Implementing Regulation (EU) 2015/707 concerning the non-approval of Rheum officinale root extract as a basic substance in accordance with Regulation (EC) No 1107/2009 of the European Parliament and of the Council concerning the placing of plant protection products on the market.