PART 10 Inspection and enforcement

59 Revocation of accreditation
1 Where the Authority is satisfied that—
(a) there is or has been a serious or repeated failure by a participant to comply with an ongoing obligation;
(b) there has been a failure to comply with a notice under regulation 58(2); or
(c) an accredited domestic plant has been given accreditation wholly or partly as a result of the provision of information which was incorrect in a material particular,
the Authority may take one or more of the steps set out in paragraph (2).
2 Where paragraph (1) applies the Authority may—
(a) revoke the accreditation for the relevant accredited domestic plant; or
(b) revoke the accreditation for any other accredited domestic plants owned by that participant.
3 Before revoking accreditation the Authority must send the participant a notice specifying—
(a) the reason for the intended revocation of accreditation including details of the respect in which the participant has failed to comply or details of the incorrect information;
(b) an explanation of the effect of the revocation; and
(c) details of the participant’s right of review.
4 Where accreditation of an accredited domestic plant has been revoked, the Authority—
(a) may reject any further accreditation application for a plant owned by the same person; and
(b) must, if the Authority has given registration relating to the accredited domestic plant, withdraw that registration.