PART 2 Membership of the Board

3 Members of the Board
1 The Board shall comprise the following members—
(a) the Mayor who shall be the chair of the Board;
(b) four elected members of any London borough council or the Common Council appointed by the London councils (“council members”);
(c) two persons appointed by the London councils and one person appointed by the Mayor (“independent members”).
This is subject to paragraphs (2) and (3) and article 4.
2 The London councils must ensure that, at any given time, no two or more council members are from the same London borough council or the Common Council.
3 The London councils or the Mayor may not appoint any person as an independent member if that person is an elected member of any London borough council or the Common Council.