2 Amendment of the Energy Performance of Buildings (Scotland) Regulations 2008
1 Subject to regulation 3, the 2008 Regulations are amended in accordance with paragraph (2).
2 In regulation 10A (fees for entering data onto register)—
(a) in paragraph (a) for “£1.15” substitute “£2.60”; and
(b) in paragraph (b) for “£5.36” substitute “£12.10”.