3 Amendment of the Firefighters’ Pension Scheme (Scotland) Order 2007
For the Table in Annex A1 (pensions contributions), substitute—

“Pensionable pay	Contribution rate from 1st April 2014
Up to and including £15,000	8.5% of pensionable pay
More than £15,000 and up to and including £21,000	9.4% of pensionable pay
More than £21,000 and up to and including £30,000	10.4% of pensionable pay
More than £30,000 and up to and including £40,000	10.9% of pensionable pay
More than £40,000 and up to and including £50,000	11.2% of pensionable pay
More than £50,000 and up to and including £60,000	11.3% of pensionable pay
More than £60,000 and up to and including £100,000	11.7% of pensionable pay
More than £100,000 and up to and including £120,000	12.1% of pensionable pay
More than £120,000	12.5% of pensionable pay”

.