SCHEDULE 3 Transitional provisions

PART 4 Transition members becoming active members of this scheme

14 Transition members with continuity of service
A transition member (P) who has continuity of service becomes an active member of this scheme—
(a) if P is in pensionable service on the transition date, on that date; or
(b) on re-entering pensionable service after the transition date.