4 Conditions of grant
1 Works for which a grant is made must only be carried out by network installers.
2 If access is not made available to the dwelling or the applicant for a grant fails to co operate with an administering agency or its agents to allow works to be carried out, a grant may be withdrawn.
3 If the applicant occupies a dwelling as a tenant, the grant may only be made if the landlord consents to the work.
4 No grant may be made unless the dwelling is suitable for the proposed works.
5 No grant may be made in respect of any dwelling for which a grant under these Regulations has been made within the previous 10 years.
6 All works must comply with such standards as to materials and quality of work as may be laid down from time to time by an administering agency with the consent of the Scottish Ministers.
7 The offer of a grant may be made conditional on the carrying out of other works.
Reg. 4 in force at 6.4.2009, see reg. 1