SCHEDULE Exempted fireplaces
14 Nestor Martin Stanford S23 Multi-fuel Stove (6kW Nominal Thermal Output), manufactured by Nestor Martin S A Finuick Nv Voie Axiale 5 B-5660 Couvin Belgium