SCHEDULE 2 TESTING OF CERAMIC ARTICLES

PART II METHODS OF ANALYSIS FOR DETERMINATION OF THE MIGRATION OF LEAD AND CADMIUM

1 Object and field of application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Principle
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Reagents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Performance criteria of the instrumental method of analysis
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Method
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (22.12.2012) by The Materials and Articles in Contact with Food (Scotland) Regulations 2012 (S.S.I. 2012/318), reg. 1, sch. 2 (with reg. 3)