SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s and Wood Energy Limited’s instructions entitled Binder Equipment Installation, Commissioning and Maintenance dated 17th May 2005 and bearing the reference WELBinderManualrev0.doc, revision 0.	