SCHEDULE AMENDMENT OF THE FIREFIGHTERS' PENSION SCHEME
87 In rule N19 (application of rules of this Scheme to pension credit members etc.), for “rule L2 (expenses and receipts of fire authorities)” substitute “rule LA2 (expenses and receipts of fire and rescue authorities)”.
Inserted by article 3 of S.S.I. 2001/310.