15
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (30.10.2007) by The Natural Mineral Water, Spring Water and Bottled Drinking Water (Scotland) (No. 2) Regulations 2007 (S.S.I. 2007/483), regs. 1(1), 23(2) (with reg. 3)