3 Revocation and saving
1 Subject to paragraph (2) below, the Foot-and-Mouth Disease (Ascertainment of Value) (Scotland) (No. 3) Order 2001 (“the No. 3 Order”) is revoked.
S.S.I. 2001/130.
2 Notwithstanding the revocation of the No. 3 Order by virtue of paragraph (1) above, that Order shall continue to have effect–
(a) for the purposes of determination of the value of an animal to which that Order applied; and
(b) for the purposes of article 3(2) of the No. 3 Order.