SCHEDULE 1 ACTIVITIES AND INSTALLATIONS AND MOBILE PLANT

PART 1 ACTIVITIES
CHAPTER 5: WASTE MANAGEMENT SECTION 5.7: Treatment of waste water

PART A
Independently operated treatment of waste water not covered by Directive 91/271/EEC and discharged by an installation carrying out any other Part A activity.