3 Modifications of the Fire Safety (Scotland) Regulations 2006
1 In their application in relation to premises of a type mentioned in section 78(5)(h) of the Fire (Scotland) Act 2005 (meaning of “relevant premises”), the Fire Safety (Scotland) Regulations 2006 are modified as follows.
S.S.I. 2006/456.
2 In regulation 8 (duty to record information), omit paragraph (b).
3 In regulation 10(2) (fire safety arrangements), omit paragraph (b).
4 In regulation 17(1), (2), (3), (4) and (7) (safety assistance) and regulation 19 (provision of information to employers and the self-employed from outside undertakings) omit “or 54” each time it appears.