SCHEDULE 2

PART 4 Measures for the control of European populations of Potato cyst nematode

15 Controls on contaminated bulbs etc.
No person may plant any susceptible bulbs or susceptible plants which have been designated as contaminated pursuant to paragraph 11(3), unless they have been subject to the measures set out in Section 3(A) of Annex 3 to Directive 2007/33/EC and an inspector has confirmed by notice that they are no longer contaminated.
Sch. 2 para. 15 in operation at 14.12.2019, see reg. 1