SCHEDULE 1 ESSENTIAL HEALTH AND SAFETY REQUIREMENTS

POTENTIAL IGNITION SOURCES

16 Hazards arising from different ignition sources
Potential ignition sources such as sparks, flames, electric arcs, high surface temperatures, acoustic energy, optical radiation, electromagnetic waves and other ignition sources shall not occur.