PART 2 OBLIGATIONS OF ECONOMIC OPERATORS

CHAPTER 1 MANUFACTURERS

8 Retention of technical documentation and EU declaration of conformity
A manufacturer shall keep the technical documentation and the EU declaration of conformity (or where applicable, the attestation of conformity) drawn up in respect of a product for a period of 10 years beginning on the day on which the product is placed on the market.