SCHEDULE

“SCHEDULE 3A

Table 1 Tariffs for Small Biomass and Medium Biomass Installations
Tariff name	Sources of energy or Technology	Installation capacity	Tariff Pence/kWh
Small Biomass	Solid biomass including solid biomass contained in municipal solid waste	Less than 20kWth	Tier 1:6.8 Tier 2:1.5
Medium Biomass	Solid biomass including solid biomass contained in municipal solid waste	20kWth and above up to but not including 200kWth	Tier 1:6.5 Tier 2:1.5
Regulation 36”

Regulation 6