1 Citation, commencement and interpretation
1 This Order may be cited as the Occupational Pensions (Revaluation) Order (Northern Ireland) 2016 and shall come into operation on 1st January 2017.
2 The Interpretation Act (Northern Ireland) 1954 shall apply to this Order as it applies to an Act of the Assembly.
1954 c. 33 (N.I.)