8 Amendment of regulation 213 (interpretation of Part 12)
1 Regulation 213 is amended as follows.
Regulation 213 was amended by and S.I. 2013/235, 2014/490 and 1878 and 2015/323.
2 In paragraph (1)—
(a) in the definition of “health prescription”, for “pharmacist — independent prescriber” substitute “pharmacist independent prescriber, physiotherapist independent prescriber, podiatrist independent prescriber, therapeutic radiographer independent prescriber”;
(b) omit the definition of “registered dietitian”;
(c) omit the definition of “registered physiotherapist”;
(d) omit the definition of “registered podiatrist”;
(e) omit the definition of “registered radiographer”; and
(f) in the definition of “relevant prescriber”, after paragraph (f) insert—

“(fa) a physiotherapist independent prescriber;
(fb) a podiatrist independent prescriber;
(fc) a therapeutic radiographer independent prescriber;”

.