1 Citation and commencement
These Regulations may be cited as the Licensing (Designation of Outdoor Stadia) Regulations (Northern Ireland) 2016 and shall come into operation on 1st September 2016.

2 Designation of outdoor stadium
The main stadium of the Irish Rugby Football Union in Ulster at 85 Ravenhill Park, Belfast is designated as an outdoor stadium of importance to the whole of Northern Ireland for the purposes of Article 2AA(c) of the Licensing (Northern Ireland) Order 1996.
Sealed with the Official Seal of the Department for Communities on 19th July 2016.
(L.S.) Andrew Hamilton A senior officer of the Department for Communities