SCHEDULE 1 TABLES OF ACTION LEVELS AND EXPOSURE LIMIT VALUES

PART 3 INDIRECT EFFECTS OF EXPOSURE

Action Levels – non-thermal effects

1 Notes
“f” is the frequency expressed in kHz.