3 Provisions coming into force on 31st October 2016
1 The following provisions of the Welfare Reform (Northern Ireland) Order 2015 come into force on 31st October 2016.
2 In Part 4 (other benefit changes)—
(a) Article 70(1) and (2);
(b) Article 71;
(c) Article 72(1) and (2), for remaining purposes;
(d) Articles 73 and 74.
3 In Part 8 (repeals), Part 6 of Schedule 12.