SCHEDULE 2 APPENDIX 7 TO ANNEX XVII OF THE REACH REGULATIONS – SPECIAL PROVISIONS ON THE LABELLING OF ARTICLES CONTAINING ASBESTOS
2 The dimensions in millimetres of the label referred to in paragraph 1 shall be those shown on the diagram in that paragraph, except that larger measurements may be used, but in that case the dimension indicated as h on the diagram shall be 40% of the dimension indicated as H.