SCHEDULE 2 TSE MONITORING

PART I MONITORING FOR TSE

9 Brain stem sampling of bovine animals (slaughterhouses)
(1) The occupier of a slaughterhouse in which a bovine animal specified in point 2 of Part I of Chapter A of Annex III to the EU TSE Regulation, is slaughtered or (if the animal has been slaughtered at a place other than the slaughterhouse) processed must—
(a) take a sample comprising the brain stem for testing in accordance with point 1 of Chapter C of Annex X to the EU TSE Regulation;
(b) ensure that the animal from which the sample has been taken can be identified; and
(c) arrange for the sample to be delivered to an approved testing laboratory,
and failure to do so is an offence.
(2) The Department must, notify the occupier of a slaughterhouse if an animal comes into any of the categories specified in point 2(1) of Part I of Chapter A of Annex III to the EU TSE Regulation (except in the case of a dead animal consigned to a slaughterhouse with a written declaration from a veterinary surgeon that it falls into one of those categories).
(3) In accordance with point 5 of Part I of Chapter A of Annex III to the EU TSE Regulation, the Department may serve a notice on the occupier of a slaughterhouse requiring them to take a sample from any bovine animal slaughtered there and send the sample for testing in accordance with sub-paragraph (1).