SCHEDULE CONTROL OF SALMONELLA IN TURKEY FLOCKS SCHEME (NORTHERN IRELAND) 2010

11 Records
Any person required to keep a record under this Scheme must keep it for two years from the date it is made and must produce it on demand to an inspector or officer of the Department and allow a copy of it to be made or an extract from it to be taken.