4 Amendment to the Valuation Tribunal Rules (Northern Ireland) 2007
In rule 5 (Notice of appeal) after paragraph (e) insert—

“(f) an appeal under regulation 9(1) of the 2010 (Energy Efficiency Homes Scheme) Regulations shall be instituted by delivering to the Secretary a notice of appeal in accordance with Form 6 within 28 days of the Department issuing the notice of the result of the review;
(g) an appeal under regulation 10(1) of the 2010 (Low-Carbon Homes Scheme) Regulations shall be instituted by delivering to the Secretary a notice of appeal in accordance with Form 7 within 28 days of the Department issuing the notice of the result of the review.”

.