3 Interpretation
1 The Interpretation Act (Northern Ireland) 1954 shall apply to these Regulations as it applies to an Act of the Northern Ireland Assembly.
1954 c. 33 (N.I.)
2 In these Regulations—
“the 1988 Regulations” means the Measuring Instruments (EEC Requirements) Regulations 1988;
“the 2000 Regulations” means the Non-automatic Weighing Instruments Regulations 2000; and
“the Department” means the Department of Enterprise, Trade and Investment.
S.I. 1988/186 as amended by S.I. 1988/1128
S.I. 2000/3236