2 Revocation and saving
1 Subject to paragraph (2), the Measuring Instruments (EEC Requirements) (Verification Fees) Regulations (Northern Ireland) 2007 are revoked.
S.R. 2007 No. 124
2 The Regulations referred to in paragraph (1) shall continue to apply in relation to any verification carried out before 1st April 2009.