SCHEDULE
Regulation 4

PART 1 ITEMS OF WEIGHING OR MEASURING EQUIPMENT TO WHICH ARTICLE 9 OF THE ORDER APPLIES
In this Part, the abbreviation employed to refer to the kilogramme unit of measurement is kg
NOTE – previous fees in brackets	£	
		
A. Measuring equipment for measuring liquid fuel or lubricants, or mixtures thereof, each instrument —		
(1) single type	81.50	(79.00)
(2) multi-product types with two sales indicators common to each delivery nozzle when in use	134.00	(130.00)
(3) multi-product types with one sales indicator common to each delivery nozzle when in use—		
(a) for testing an entire instrument consisting of —		
(i) two meters and associated sales indicator	114.50	(111.00)
(i) three meters and associated sales indicator	155.00	(150.00)
(i) four or more meters and associated sales indicator	216.00	(209.00)
(a) for retesting part of an instrument consisting of any number of meters as provided for in regulation 22(1)(a) of the 1998 Regulations where—		
(i) only one meter is retested	81.50	(79.00)
(i) only two meters are retested	114.50	(111.00)
(i) only three meters are retested	155.00	(150.00)
		
B. Non-automatic weighing equipment, each item of equipment or (if fitted with two or more weigh tables or platforms connected to one or more indicating mechanisms), each weigh table or platform —		
		
capacity as marked on the equipment —		
not exceeding 100 kg	24.00	(23.00)
exceeding 100 kg but not exceeding 1,000 kg	51.50	(50.00)
exceeding 1,000 kg but not exceeding 5,000 kg	122.00	(118.00)
exceeding 5,000 kg but not exceeding 30,000 kg	266.50	(258.00)
exceeding 30,000 kg	398.50	(386.00)
NOTE – previous fees in brackets	£		
			
C. Measuring equipment for measuring liquid fuel delivered from road tankers —			
			
(1) meter measuring systems, each system —			
basic fee	112.50	(109.00)	
where more than one liquid is used in testing, each additional liquid	32.00	(31.00)	
for retesting of a system solely on the occasion of an occurrence as defined in either regulation 65 or 66 of the 1984 Regulations	24.00	(23.00)	
			
(2) dipstick measuring systems, each system —			
basic fee (for calibration of each compartment and production of calibration chart)	130.00	(126.00)	
initial dipstick	16.50	(16.00)	
spare dipstick	16.50	(16.00)	
replacement dipstick	32.00	(31.00)	
			
In this paragraph the expressions “meter measuring system”, “replacement dipstick”, “road tanker” and “spare dipstick” shall have the meanings given to them by regulation 2(1) of the 1984 Regulations			
			
D. Any item of weighing or measuring equipment not falling within paragraph A, B or C of this Part —			
			
per man/hour spent at the place of submission	Inspector rate 39.00	(38.00)	
	Assistant rate 28.00		(27.00)

PART II ITEMS OF WEIGHING OR MEASURING EQUIPMENT TO WHICH ARTICLE 9B OF THE ORDER APPLIES
NOTE – previous fees in brackets	£	
		
Any item of weighing or measuring equipment to which Article 9B of the Order applies —		
		
per man/hour spent at the place of submission	Inspector rate 39.00	(38.00)
	Assistant rate 28.00	(27.00)