SCHEDULE SCHEDULE 3 TO THE PRINCIPAL REGULATIONS AS SUBSTITUTED BY THESE REGULATIONS
Regulation 3(3)

“SCHEDULE 3 VOUCHER VALUE REPAIR
Regulations 19(2) and (3)
Letter Codes – Values									
Nature of repair	A £	B £	C £	D £	E £	F £	G £	H £	I £
Repair or replacement of One lens	11.05	20.30	32.80	82.50	24.00	32.35	43.90	91.35	84.65
Repair or replacement of Two lenses	22.10	40.60	65.60	165.00	48.00	64.70	87.80	182.70	169.30
Repair or replacement of:									
the front of a frame	11.35	11.35	11.35	11.35	11.35	11.35	11.35	11.35	11.35
a side of a frame	6.75	6.75	6.75	6.75	6.75	6.75	6.75	6.75	6.75
the whole frame	13.40	13.40	13.40	13.40	13.40	13.40	13.40	13.40	13.40”