3 Application
1 Subject to paragraphs (2) and (3), these Regulations apply to a measuring system which is—
(a) for use for trade in the making of a continuous and dynamic measurement of liquid fuel in a quantity equal to or less than 100 litres or 100 kilograms; and
(b) first placed on the market or put into use on or after 15th October 2007.
2 These Regulations do not apply to a measuring system—
(a) in respect of which a certificate of approval has been granted before 15th October 2007 and is in force; and
(b) which is first passed as fit for use for trade and stamped under the Measuring Equipment (Liquid Fuel and Lubricants) Regulations (Northern Ireland) 1998.
S.R. 1998 No. 113, as amended by S.R. 2002 No. 71, S.R. 2003 No. 422, S.R. 2005 No. 26 and S.R. 2005 No. 472
3 These Regulations do not apply to a measuring system to which the 2006 Regulations do not apply by virtue of regulation 3(3) to (6) thereof.