6 Manner of use
Where an automatic catchweigher is marked with a measurement range a person shall not use that instrument for trade for determining a weight outside that range in relation—
(a) to, or to articles made from, gold, silver or other precious metals, including gold or silver thread or fringe;
(b) to precious stones or pearls; or
(c) to drugs or other pharmaceutical products.