SCHEDULE 1

PART II DOCUMENTS AND PARTICLARS TO ACCOMPANY AN APPLICATION FOR A PUBLIC ELECTRICITY SUPPLY LICENCE
1 Current statements of the accounts kept by the applicant in respect of any undertaking carried on by him, showing the financial state of affairs of that undertaking and its profit or loss, and the statements for the most recent period, together with copies of the latest audited annual accounts where such have been prepared.
2 An outline statement of the business proposals, for that business of the applicant to which the application relates, for the next five years, which includes:
(a) particulars of the person or persons from whom the applicant intends to acquire the electricity which he will supply, and particulars of the arrangements made for the transmission and distribution of that electricity;
(b) forecast annual maximum demand (MW) to be supplied, giving a breakdown of the demand for each type of customer, eg. industrial, commercial etc. and energy (GWh) to be supplied;