2 Amendment of the Foyle Area (Control of Netting) Regulations 1981
The Foyle Area (Control of Netting) Regulations 1981 shall be amended in accordance with regulations 3 to 6.
S.R. 1981 No. 169 as amended by S.R. 1982 No. 174; S.R. 1983 No. 110; S.R. 1983 No. 143; S.R. 1984 No. 170; S. R. No. 101; S.R. 1985 No. 342; S.R. 1986 No. 144; S.R. 1988 No. 187 and S.R. 1990 No. 200