SCHEDULE 7 Requirements for assessment methods other than fixed measurement

PART 2 Group B pollutants

3 Requirements for air quality models
Where an air quality model is used for assessment, references to descriptions of the model and information on the uncertainty shall be compiled. The uncertainty for modelling is defined as the maximum deviation of the measured and calculated concentration levels, over a full year, without taking into account the timing of the events.