SCHEDULE 1 ILL–HEALTH PENSIONS
2 The annual amount of the higher tier ill–health pension of a whole-time firefighter shall be calculated in accordance with the formula—
(A×2)100×B×C60
, where
A is the pensionable service accrued in the Scheme before his ill–health retirement;
B is—
(a) the pensionable service that he would have accrued from the date of his ill–health retirement until his normal retirement age had he continued to be a contributing member of the Scheme (his “prospective service”); or
(b) if the aggregate of his actual pensionable service and his prospective service is more than 40 years, the difference between 40 years and his actual pensionable service; and
C is his final pensionable pay.