1 Citation and commencement
These Regulations may be cited as the Occupational Pension Schemes (Levies) (Amendment) Regulations (Northern Ireland) 2007 and shall come into operation—
(a) for the purposes of this regulation and regulation 2(9), on 30th March 2007, and
(b) for all other purposes, on 1st April 2007.