SCHEDULE 4 APPROVAL OF LABORATORIES UNDER THE NORTHERN IRELAND POULTRY HEALTH ASSURANCE SCHEME

PART I APPROVAL
3 In order to ensure that approved laboratories remain suitable for approval, an inspector shall carry out inspections and quality assurance testing as the Department considers necessary.